---
title: REST API
---

To support the development of various types of platforms, TDengine provides an API that conforms to the REST principle, namely REST API. To minimize the learning cost, different from the other database REST APIs, TDengine directly requests the SQL command contained in the request BODY through HTTP POST to operate the database and only requires a URL.

:::note 
One difference from the native connector is that the REST interface is stateless, so the `USE db_name` command has no effect. All references to table names and super table names need to specify the database name prefix. (Since version 2.2.0.0, it is supported to specify db_name in RESTful URL. If the database name prefix is not specified in the SQL command, the `db_name` specified in the URL will be used. Since version 2.4.0.0, REST service is provided by taosAdapter by default. And it requires that the `db_name` must be specified in the URL.)
:::

## Installation

The REST interface does not rely on any TDengine native library, so the client application does not need to install any TDengine libraries. The client application's development language supports the HTTP protocol is enough.

## Verification

If the TDengine server is already installed, it can be verified as follows:

The following is an Ubuntu environment using the `curl` tool (to confirm that it is installed) to verify that the REST interface is working.

The following example lists all databases, replacing `h1.taosdata.com` and `6041` (the default port) with the actual running TDengine service FQDN and port number.

```html
curl -H 'Authorization: Basic cm9vdDp0YW9zZGF0YQ==' -d 'show databases;' h1.taosdata.com:6041/rest/sql
```

The following return value results indicate that the verification passed.

```json
{
  "status": "succ",
  "head": [
    "name",
    "created_time",
    "ntables",
    "vgroups",
    "replica",
    "quorum",
    "days",
    "keep1,keep2,keep(D)",
    "cache(MB)",
    "blocks",
    "minrows",
    "maxrows",
    "wallevel",
    "fsync",
    "comp",
    "precision",
    "status"
  ],
  "data": [
    [
      "log",
      "2020-09-02 17:23:00.039",
      4,
      1,
      1,
      1,
      10,
      "30,30,30",
      1,
      3,
      100,
      4096,
      1,
      3000,
      2,
      "us",
      "ready"
    ]
  ],
  "rows": 1
}
```

## HTTP request URL format

```
http://<fqdn>:<port>/rest/sql/[db_name]
```

Parameter Description:

- fqnd: FQDN or IP address of any host in the cluster
- port: httpPort configuration item in the configuration file, default is 6041
- db_name: Optional parameter that specifies the default database name for the executed SQL command. (supported since version 2.2.0.0)

For example, `http://h1.taos.com:6041/rest/sql/test` is a URL to `h1.taos.com:6041` and sets the default database name to `test`.

TDengine supports both Basic authentication and custom authentication mechanisms, and subsequent versions will provide a standard secure digital signature mechanism for authentication.

- The custom authentication information is as follows (Let's introduce token later)

  ```
  Authorization: Taosd <TOKEN>
  ```

- Basic authentication information is shown below

  ```
  Authorization: Basic <TOKEN>
  ```

The HTTP request's BODY is a complete SQL command, and the data table in the SQL statement should be provided with a database prefix, e.g., `db_name.tb_name`. If the table name does not have a database prefix and the database name is not specified in the URL, the system will response an error because the HTTP module is a simple forwarder and has no awareness of the current DB.

Use `curl` to initiate an HTTP request with a custom authentication method, with the following syntax.

```bash
curl -H 'Authorization: Basic <TOKEN>' -d '<SQL>' <ip>:<PORT>/rest/sql/[db_name]
```

Or

```bash
curl -u username:password -d '<SQL>' <ip>:<PORT>/rest/sql/[db_name]
```

where `TOKEN` is the string after Base64 encoding of `{username}:{password}`, e.g. `root:taosdata` is encoded as `cm9vdDp0YW9zZGF0YQ==`.

## HTTP Return Format

The return result is in JSON format, as follows:

```json
{
    "status": "succ",
    "head": ["ts", "current", ...],
    "column_meta": [["ts",9,8],["current",6,4], ...],
    "data": [
        ["2018-10-03 14:38:05.000", 10.3, ...],
        ["2018-10-03 14:38:15.000", 12.6, ...]
    ],
    "rows": 2
}
```

Description:

- status: tell if the operation result is success or failure.
- head: the definition of the table, or just one column "affected_rows" if no result set is returned. (As of version 2.0.17.0, it is recommended not to rely on the head return value to determine the data column type but rather use column_meta. In later versions, the head item may be removed from the return value.)
- column_meta: this item is added to the return value to indicate the data type of each column in the data with version 2.0.17.0 and later versions. Each column is described by three values: column name, column type, and type length. For example, `["current",6,4]` means that the column name is "current", the column type is 6, which is the float type, and the type length is 4, which is the float type with 4 bytes. If the column type is binary or nchar, the type length indicates the maximum length of content stored in the column, not the length of the specific data in this return value. When the column type is nchar, the type length indicates the number of Unicode characters that can be saved, not bytes.
- data: The exact data returned, presented row by row, or just [[affected_rows]] if no result set is returned. The order of the data columns in each row of data is the same as that of the data columns described in column_meta.
- rows: Indicates how many rows of data there are.

The column types in column_meta are described as follows:

- 1:BOOL
- 2:TINYINT
- 3:SMALLINT
- 4:INT
- 5:BIGINT
- 6:FLOAT
- 7:DOUBLE
- 8:BINARY
- 9:TIMESTAMP
- 10:NCHAR

## Custom Authorization Code

HTTP requests require an authorization code `<TOKEN>` for identification purposes. The administrator usually provides the authorization code, and it can be obtained simply by sending an ``HTTP GET`` request as follows:

```bash
curl http://<fqnd>:<port>/rest/login/<username>/<password>
```

Where `fqdn` is the FQDN or IP address of the TDengine database. `port` is the port number of the TDengine service. `username` is the database username. `password` is the database password. The return value is in `JSON` format, and the meaning of each field is as follows.

- status: flag bit of the request result

- code: return value code

- desc: authorization code

Example of getting authorization code.

```bash
curl http://192.168.0.1:6041/rest/login/root/taosdata
```

Response body:

```json
{
  "status": "succ",
  "code": 0,
  "desc": "/KfeAzX/f9na8qdtNZmtONryp201ma04bEl8LcvLUd7a8qdtNZmtONryp201ma04"
}
```

## For example

- query all records from table d1001 of database demo

  ```bash
  curl -H 'Authorization: Basic cm9vdDp0YW9zZGF0YQ==' -d 'select * from demo.d1001' 192.168.0.1:6041/rest/sql
  ```

  Response body:

  ```json
  {
    "status": "succ",
    "head": ["ts", "current", "voltage", "phase"],
    "column_meta": [
      ["ts", 9, 8],
      ["current", 6, 4],
      ["voltage", 4, 4],
      ["phase", 6, 4]
    ],
    "data": [
      ["2018-10-03 14:38:05.000", 10.3, 219, 0.31],
      ["2018-10-03 14:38:15.000", 12.6, 218, 0.33]
    ],
    "rows": 2
  }
  ```

- Create database demo:

  ```bash
  curl -H 'Authorization: Basic cm9vdDp0YW9zZGF0YQ==' -d 'create database demo' 192.168.0.1:6041/rest/sql
  ```

  Response body:

  ```json
  {
    "status": "succ",
    "head": ["affected_rows"],
    "column_meta": [["affected_rows", 4, 4]],
    "data": [[1]],
    "rows": 1
  }
  ```

## Other Uses

### Unix timestamps for result sets

When the HTTP request URL uses `/rest/sqlt`, the returned result set's timestamp value will be in Unix timestamp format, for example:

```bash
curl -H 'Authorization: Basic cm9vdDp0YW9zZGF0YQ==' -d 'select * from demo.d1001' 192.168.0.1:6041/rest/sqlt
```

Response body:

```json
{
  "status": "succ",
  "head": ["ts", "current", "voltage", "phase"],
  "column_meta": [
    ["ts", 9, 8],
    ["current", 6, 4],
    ["voltage", 4, 4],
    ["phase", 6, 4]
  ],
  "data": [
    [1538548685000, 10.3, 219, 0.31],
    [1538548695000, 12.6, 218, 0.33]
  ],
  "rows": 2
}
```

### UTC format for the result set

When the HTTP request URL uses `/rest/sqlutc`, the timestamp of the returned result set will be expressed as a UTC format, for example:

```bash
  curl -H 'Authorization: Basic cm9vdDp0YW9zZGF0YQ==' -d 'select * from demo.t1' 192.168.0.1:6041/rest/sqlutc
```

Response body:

```json
{
  "status": "succ",
  "head": ["ts", "current", "voltage", "phase"],
  "column_meta": [
    ["ts", 9, 8],
    ["current", 6, 4],
    ["voltage", 4, 4],
    ["phase", 6, 4]
  ],
  "data": [
    ["2018-10-03T14:38:05.000+0800", 10.3, 219, 0.31],
    ["2018-10-03T14:38:15.000+0800", 12.6, 218, 0.33]
  ],
  "rows": 2
}
```

## Important configuration items

Only some configuration parameters related to the RESTful interface are listed below. Please see the description in the configuration file for other system parameters.

- The port number of the external RESTful service is bound to 6041 by default (the actual value is serverPort + 11, so it can be changed by modifying the setting of the serverPort parameter).
- httpMaxThreads: the number of threads to start, default is 2 (the default value is rounded down to half of the CPU cores with version 2.0.17.0 and later versions).
- restfulRowLimit: the maximum number of result sets (in JSON format) to return. The default value is 10240.
- httpEnableCompress: whether to support compression, the default is not supported. Currently, TDengine only supports the gzip compression format.
- httpDebugFlag: logging switch, default is 131. 131: error and alarm messages only, 135: debug messages, 143: very detailed debug messages.
- httpDbNameMandatory: users must specify the default database name in the RESTful URL. The default is 0, which turns off this check. If set to 1, users must put a default database name in every RESTful URL. Otherwise, it will return an execution error and reject this SQL statement, regardless of whether the SQL statement executed at this time requires a specified database.

:::note 
If you are using the REST API provided by taosd, you should write the above configuration in taosd's configuration file taos.cfg. If you use the REST API of taosAdapter, you need to refer to taosAdapter [corresponding configuration method](/reference/taosadapter/).
:::
