Go to the C:\TDengine directory from `cmd` and execute `taos.exe` directly to connect to the TDengine service and enter the TDengine CLI interface, for example, as follows:

```text
  C:\TDengine>taos
  Welcome to the TDengine  shell from Linux, Client Version:2.0.5.0
  Copyright (c) 2017 by  TAOS Data, Inc. All rights reserved.
  taos> show  databases;
  name       |   created_time    |   ntables  |  vgroups   | replica | quorum | days |    keep1,keep2,keep(D)   | cache(MB)   |  blocks  |   minrows  |  maxrows   | wallevel |  fsync  | comp | precision |  status    |
  ===================================================================================================================================================================================================================================================================
  test       | 2020-10-14  10:35:48.617 |     10 |      1 |    1 |   1 |     2 | 3650,3650,3650        |     16 |      6 |     100 |    4096 |    1 |    3000 |  2 | ms    | ready    |
  log        | 2020-10-12  09:08:21.651 |      4 |      1 |    1 |   1 |    10 | 30,30,30              |      1 |      3 |     100 |    4096 |    1 |    3000 |  2 | us    | ready    |
  Query OK, 2 row(s) in  set (0.045000s)
  taos>
```
