- Client driver installed (mandatory for native connections, not required for REST connections)

:::info

Since the TDengine client driver is written in C, using the native connection requires loading the client driver shared library file, which is usually included in the TDengine installer. You can install either standard TDengine server installation package or [TDengine client installtion package](/get-started/). For Windows development, you need to install the corresponding [Windows client](https://www.taosdata.com/cn/all-downloads/#TDengine-Windows-Client) for TDengine.

- libtaos.so: After successful installation of TDengine on a Linux system, the dependent Linux version of the client driver libtaos.so file will be automatically copied to /usr/lib/libtaos.so, which is included in the Linux scanable path and does not need to be specified separately.
- taos.dll: After installing the client on Windows, the dependent Windows version of the client driver taos.dll file will be automatically copied to the system default search path C:/Windows/System32, again without the need to specify it separately.

:::
